Run Date: AIM Independent Resource Benchmark - Suite IX "1.1" Machine: ARM-Machine Configuration: Jan 00:00:02 UTC 2009 Test File Size: add_double 62686.57 Thousand Double Precision Additions/second kbytes

AIM Independent Resource Benchmark

Suite IX

Arithmetic (Thousand Ops per Second)

Short Int Long Float Double

Add Div Mult

InterProcess Communication (Messages per Second) TCP/IP UDP/IP FIFOs PIPEs Shared RAM Stream Pipe DataGram Pipe Disk/Filesystem I/O (Kbytes per Second and Ops per Second) Cached Sync Rand Read Seq Write Rand Write Searches Copy Seq Read Create/Close Link/Unlink Directory

Library/System (Various Rates) Setjmp/Longjmp RAM Copy Numeric Rtns Trig Rtns String Rtns Mem Rtns 1 Mem Rtns 2 Sort/Search Signals Misc. Rtns Shell Rtns 1 Shell Rtns 2 Shell Rtns 3

Algorithmic Tests Operations per Second Newton/Raphson 3D Projection Linear System Taylor Series Integer Sieve

Memory and Process Management

(Ops per Second) Brk() Paging Exec() Fork()

Function Calls (Ops per Second) 0 Args 1 Arg 2 Args 15 Args

Copyright (c) 1996 - 2001 Caldera International, Inc. All Rights Reserved. These results are not certified.

998020 138150 854400 2670000 157950 1701360 2656716 157950 1697040 108000 94500 84906

-1.0 60000 62559

-1.0 -1.0 665950 722000 567750 514150 485950

20528

180856 7791

272557 7724

217600

106238 210376 1067303 367000 157280 5055000

8808000 1803216420

60249 66667 4109 2550000 560350

1080 -1.0 27965 1635 1635 1694

29200 825350 72 1298950 80

1091045 379100 2095 10498

197376000 245248000 192827861 66816000