Run Date: Apr 26 12:38:23 2016 Machine: lenovo Configuration:

Test File Size: 5120K kbytes

AIM Independent Resource Benchmark

Suite IX

Arithmetic (Thousand Ops per Second)

Short Int Long Float Double

Add Div Mult

InterProcess Communication (Messages per Second) TCP/IP UDP/IP FIFOs PIPEs Shared RAM Stream Pipe DataGram Pipe Disk/Filesystem I/O (Kbytes per Second and Ops per Second) Cached Sync Rand Read Seq Write Rand Write Searches Copy Seq Read Create/Close Link/Unlink Directory

Library/System (Various Rates) Setjmp/Longjmp RAM Copy Numeric Rtns Trig Rtns String Rtns Mem Rtns 1 Mem Rtns 2 Sort/Search Signals Misc. Rtns Shell Rtns 1 Shell Rtns 2 Shell Rtns 3

Algorithmic Tests Operations per Second Newton/Raphson 3D Projection Linear System Taylor Series Integer Sieve

Memory and Process Management

(Ops per Second) Brk() Paging Exec() Fork()

Function Calls (Ops per Second) 0 Args 1 Arg 2 Args 15 Args

Copyright (c) 1996 - 2001 Caldera International, Inc. All Rights Reserved. These results are not certified.

3324000 97200 532050 3630000 76500 620640 3611940 76567 366240 722388 237000 704477 721782 235820 704477

42300 94800 271442 774850 519350 385700 409800

27 150288 27 256000 27 198686

35325 185950 1118720

84000 55818 1485000

18325500 -2147483648.0 276450 970000

4676 5388059 1372750

1895 -1.0 18575 260 269 269

662000 5600450

1144 16412200 78

1082587 176800 380 2216

192768000 192318407 190464000 110336000